`manual.adoc` contains Freedoom’s manual. It is intended to be built
as a PDF file but can also be viewed in HTML format. To build as a
PDF, https://asciidoctor.org/[Asciidoctor] is required, since it has
superior PDF output to the Asciidoc reference implementation.
