<?xml version="1.0" encoding="UTF-8"?>
<tileset version="1.10" tiledversion="1.11.1" name="bulidings" tilewidth="32" tileheight="32" tilecount="8" columns="0">
 <grid orientation="orthogonal" width="1" height="1"/>
 <tile id="0" type="LoggerTile">
  <image source="../res/logger.png" width="32" height="32"/>
 </tile>
 <tile id="1" type="PowerPoleTile">
  <image source="../res/powerpole.png" width="32" height="32"/>
 </tile>
 <tile id="2" type="CropsTile">
  <image source="../res/crops.png" width="32" height="32"/>
 </tile>
 <tile id="3" type="HydroPowerTile">
  <image source="../res/hydropower.png" width="32" height="32"/>
 </tile>
 <tile id="4" type="HousingTile">
  <image source="../res/housing.png" width="32" height="32"/>
 </tile>
 <tile id="5" type="MinerTile">
  <image source="../res/miner.png" width="32" height="32"/>
 </tile>
 <tile id="6" type="FactoryTile">
  <image source="../res/factory.png" width="32" height="32"/>
 </tile>
 <tile id="7" type="connector">
  <image source="../res/connector.png" width="32" height="32"/>
 </tile>
</tileset>
