CREATE TABLE IF NOT EXISTS `Museums` (
  `MuseumId` int(10) unsigned NOT NULL AUTO_INCREMENT,
  `Name` varchar(255) NOT NULL,
  `Domain` varchar(255) NOT NULL,
  PRIMARY KEY (`MuseumId`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4;
